From 36b592e2d9e23b8339ee8dba7980927e70e022d3 Mon Sep 17 00:00:00 2001
From: Timothy Pearson <kb9vqf@pearsoncomputing.net>
Date: Wed, 19 Nov 2014 11:01:48 -0600
Subject: Increase X start timeout as tdm was failing to start on many machines
 due to upstart/systemd parallel start slowing down Xorg's initialization

---
 tdm/config.def | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'tdm/config.def')

diff --git a/tdm/config.def b/tdm/config.def
index cea1d7147..29a023a7f 100644
--- a/tdm/config.def
+++ b/tdm/config.def
@@ -1342,7 +1342,7 @@ Description:
 
 Key: ServerTimeout
 Type: int
-Default: 15
+Default: 60
 User: core
 Instance: #:*/
 Comment:
-- 
cgit v1.2.1

